%----------------------------------------------------------------------

\documentclass[
	layoutmode=block,
	% page size...
	blockwidth=240mm, blockheight=220mm,
	bleed=4mm,
	gutteroffset=5mm,
	bindingoffset=0mm,
	% image block configuration...
	imageblockwidth=0.98, imageblockheight=0.98,
	imageblockoffsettop=0,
	% misc...
	9pt,final,openany
]{photobook}

\usepackage{lipsum}
\usepackage{ragged2e}


% - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - -

% remove section numbering...
\setcounter{secnumdepth}{0}

\setlength\parindent{0pt}

\edef\TestImage{DSC00403-2}



%----------------------------------------------------------------------
\begin{document}

% force what's next to left page of spread...
\cleartoleftpage

% text...
\begin{page}
	\lipsum[1-3]
\end{page}

% image...
\ImagePage{}{\TestImage}



%----------------------------------------------------------------------
\end{document} %                                    vim:set ts=4 sw=4 :
